Match of the day: Allowing Bryan Mbeumo goal was right decision – Shay Given

Match of the Day pundit Shay Given says that referee Michael Oliver made the right decision to allow Bryan Mbeumo’s goal to stand in Manchester United’s 2-1 win over Liverpool in the Premier League.

WATCH MORE: Maguire heads Man Utd to victory against Liverpool

Available to UK users only.